-0.18 -0.16 -0.14 -0.12 -0.1 -0.08 -0.06

-450

-400

-350

-300

η

Energy

ENERGIES FOR 2D CASE WITH N = 10x10,α = 0.5

Fully Up/Down (1,0)≡(-1,0) Simulation